%----------Bachlor Thesis Proposal-----------------------------------------------------------
\thispagestyle{myPageStyle}
\input{chap0/sec1}			% 1. Einleitung/Introduction and problem statement
\newpage

%----------Hauptteil/Main part of the thesis-----------------------------------------------------------
% \thispagestyle{myPageStyle}
% \input{Chapter1/chap1}			% 1. Einleitung/Introduction and problem statement
% \newpage

% \thispagestyle{myPageStyle}
% \input{Chapter2/chap2}			% 2. Literaturanalyse/Related work analysis
% \newpage

%\thispagestyle{myPageStyle}
%\input{Chapter3/kap_3}		  % 3. Implementation, Technical Setting, Prototype
%\newpage

%\thispagestyle{myPageStyle}
%\input{Chapter4/kap_3.2}		% 4. ...
%\newpage

%\thispagestyle{myPageStyle}
%\input{Chapter5/kap_4}			% 5. ...
%\newpage

%\thispagestyle{myPageStyle}
%\input{Chapter6/kap_5}			% 6. Study design and execution
%\newpage

%\thispagestyle{myPageStyle}
%\input{Chapter7/kap_6}			% 7. Evaluation and Results
%\newpage

% \thispagestyle{myPageStyle}
% \input{Chapter8/chap8}			% 8. Discussion, Deriving concrete action recommendations
% \newpage

% \thispagestyle{myPageStyle}	% 9. Conclusion, Future work, Limitations
% \input{Chapter9/chap9}
% \newpage