\section{Conclusion}
\label{sec:label}
Since keyboards are still the main data input device while using a computer and
are also found to be related to discomfort or even \glsfirst{WRUED}
\cite{pascarelli_wrued}, we tried to evaluate a possible modification to the
existing keyboard design, that does not require the consumers to extensively
adapt their typing behaviour, nor the producers to massively deviate from
existing manufacturing processes. Therefore, we created a keyboard that used
keyswitches with actuation forces, related to the specific finger the keyswitch
is operated with.

\subsection{Future work}
\label{sec:label}

\subsection{Limitations}
\label{sec:label}