%----------Titelseite-------------------------------------------------------------

\newgeometry{textheight=0.9\paperheight, textwidth=0.76\paperwidth, left=30mm, right=20mm}

\begin{titlepage}
	%----THI-Bertrandt-logo--------------------------------------------------------
		\begin{figure}[!h]
			\centering
			\includegraphics[width={0.4\textwidth}]{images/thiRGB.jpg}
		\end{figure}
	%------------------------------------------------------------------------------

	\begin{center}
		\hrulefill
	\end{center}


	\begin{center}
		\vspace{1cm}

		\huge\textbf{
			Bachelor's thesis}\\[2.5em]
		\normalsize
			Bachelor's course Computer Science, B. Sc.\\
			Faculty of Computer Science\\ [7em]

		\Large\textbf{
			Impact of Adjusted, per Key, Actuation Force on Efficiency and Satisfaction While Using Mechanical Keyboards} \\
	\end{center}

	\vfill


	\begin{tabular}{ll}
		Name and Surname: & \textbf{Philip Gaber}	\\ [3em]

		Issued on:	& 08.04.2021	\\ [1em] % issuing date
		Submitted on:	& 01.08.2021	\\ [3em] %date of hand in

		First examiner: 	& Prof. Priv.-Doz. Dr. techn. Andreas Riener\\ [1em]
		Second examiner: 	& Prof. Dr. rer. nat. Franz Regensburger\\[3em]
	\end{tabular}

\end{titlepage}

\restoregeometry