
%----------Glossar/Glossary-------------------------------------------------------------
\newacronym{KB}{KB}{Keyboard}
\newacronym{EMG}{EMG}{electromyography}
\newacronym{MVC}{MVC}{maximum voluntary contraction}
\newacronym{CTS}{CTS}{Carpal Tunnel Syndrome}
\newacronym{RSI}{RSI}{Repetitive Strain Injury}
\newacronym{TNS}{TNS}{Tension Neck Syndrome}
\newacronym{FRE}{FRE}{Flesch Reading Ease Score}
\newacronym{VAS}{VAS}{visual analog scale}
\newacronym{RMS}{RMS}{root-mean-square}
\newacronym{ISO}{ISO}{International Organization for Standardization}
% Mulcles alive p. 189
% Atlas of Human Anatomy p. 433
\newacronym{FDS}{FDS}{flexor digitorum superficialis}
\newacronym{FDP}{FDP}{flexor digitorum profundus}
\newacronym{ED}{ED}{extensor digitorum}
\newacronym{PBT}{PBT}{polybutylene terephthalate}
\newacronym{ABS}{ABS}{acrylonitrile butadiene styrene}
\newacronym{WRUED}{WRUED}{work related upper extremity disorders}
\newacronym{PCB}{PCB}{printed circuit board}
\newacronym{WPM}{WPM}{Words per Minute}
\newacronym{AdjWPM}{AdjWPM}{Adjusted Words per Minute}
\newacronym{KSPS}{KSPS}{Keystrokes per Second}
\newacronym{CER}{CER}{Corrected Error Rate}
\newacronym{UER}{UER}{Uncorrected Error Rate}
\newacronym{TER}{TER}{Total Error Rate}
\newacronym{KSPC}{KSPC}{Keystrokes per Character}
\newacronym{UEQ-S}{UEQ-S}{short version of the user experience questionnaire}
\newacronym{UEQ}{UEQ}{user experience questionnaire}
\newacronym{KCQ}{KCQ}{keyboard comfort questionnaire}
\newacronym{GoTT}{GoTT}{Go Typing Test}
\newacronym{API}{API}{application programming interface}
\newacronym{REST}{REST}{representational state transfer}
\newacronym{JSON}{JSON}{javascript object notation}
\newacronym{UI}{UI}{user interface}
\newacronym{PTTQ}{PTTQ}{post typing test questionnaire}
\newacronym{PKQ}{PKQ}{post keyboard questionnaire}
\newacronym{OLED}{OLED}{organic light-emitting diode}
\newacronym{GMMK}{GMMK}{Glorious Modular Mechanical Keyboards}

\newacronym{rmANOVA}{rmANOVA}{Repeated Measurement Analysis Of Variance}
\newacronym{GG}{GG}{Greenhouse–Geisser corrected}
\newacronym{Q-Q}{Q-Q}{quantile-quantile}
\newacronym{OPC}{OPC}{percentage of keyboard ``Own''}
\newacronym{SP}{SP}{starting point}
\newacronym{EP}{EP}{end point}
\newacronym{LRT}{LRT}{Likelihood Ratio Test}

\newglossaryentry{N}{
name={N},
description={Newton: 1\,N $ \approx $ 101.97\,g}
}

\newglossaryentry{cN}{
name={cN},
description={Centinewton: 1\,cN $ \approx $ 1.02\,g}
}
\newglossaryentry{g}{
name={g},
description={Gram: 1\,g $ \approx $ 0.97\,cN}
}
\newglossaryentry{gf}{
name={gf},
description={Gram-force: 1\,gf = 1\,g}
}
\newglossaryentry{QWERTY}{
name={QWERTY},
description={Keyboard layout commonly used in the US and many other countries}
}
\newglossaryentry{QWERTZ}{
name={QWERTZ},
description={Keyboard layout commonly used in Germany}
}

\newglossaryentry{bottoming}{
name={bottoming out},
description={Describes the scenario, when the typist does not release the key before impact with the bottom of the keyswitch is made}
}

\newglossaryentry{swapped}{
name={hot-swapped},
description={Usually describes the process of replacing a part of a device in a
  quick an simple way, without the need to power off the device}
}

\newglossaryentry{Topre}{
name={Topre},
description={Topre switches are keyswitches produced by the Japanese company Topre Corporation}
}

\newglossaryentry{MongoDB}{
name={MongoDB},
description={General purpose, document-based database which name originates from the word humongous}
}

\newglossaryentry{UX Curve}{
  name={UX Curve},
  description={A User Experience
    Curve is used to assess long-term user experience for a product. Users draw
    a curve, that represents a certain experience, positive, neutral or negative, for
    a specific product during a time span} }
